0 20 40 60 80

Centrality (%) 0.6

0.8

1

1.2

1.4

Data/ HIJING

) < 1.5 c (GeV/ Tp : 0.2 < ±K ) < 1.5 c (GeV/ Tp : 0.4 < 0 SK | < 0.5 η = 2.76 TeV, | NNs Pb − ALICE, Pb

c0R ccR 00R

ALI-PUB-530610

ALI-PUB-530610